CP violation with the ATLAS detector

David Rousseau CERN ATLAS Collaboration May 29, 1998 Abstract Measurements of CP violation parameters in the B system with the ATLAS detector at LHC will be reviewed. sin(2β) measurement in the B0 ! J/ψK0 channel and sin(2α) measurement in the B0 ! π+π� channel will be described in details. Other channels sensitive to the angles γ and δγ will also be covered.